0 5 10 15 20 25

-0.6

-0.4

-0.2 0 0.2 0.3 0.4 0.5 0.6

Nov-Apr UVP predicting May-Aug (Ave. corr.= 0.43)

0 5 10 15 20 25 -5 -4 -3 -2 -1 0 1 2 May-Aug streamflow anomaly loading pattern

1960 1970 1980

-0.4

-0.2 0 0.2 Pred.(blue), strm(green), NINO4(red) 16 7 5

-40 -30 -20 -10 0 10 20 30 40

60E 80E 20N

40N

60N Regression obs. precip. (1950-1984)

-10.5177

-7.8882

-5.2588

-2.6294 0 2.6294

5.2588

7.8882

10.5177

50E 100E 20N

40N

60N Regression obs. winds (1950-1984)

-4 -3 -2 -1 0 1 2 3 4

100E 150E 160W 110W

-20S 0 20N Regression ssta (1950-1984)

-8 -6 -4 -2 0 2 4 6 8

60E 80E 20N

40N

60N Nov-Apr precip. (Analysis)

-8 -6 -4 -2 0 2 4 6 8

60 80 100 120 20 25 30 35 40 45 50 55 60