0.1 0.2 0.3 0.4 0.5

20 40 60 80 100 120 140

180 σ_{obs}

°C depth

0.5 1

20 40 60 80 100 120 140

180 σ_{fg}

°C 0.5 1 1.5

20 40 60 80 100 120 140

180

L_x

× 10^3 km

Dec 1992 Jan 1993 Feb 1993 DJF 1993

ML estimated error covariance paramters (MOM-3)

0.1 0.2 0.3 0.4 0.5

20 40 60 80 100 120 140

180

L_y

× 10^3 km