-1 -0.5 0 0.5 1 -3

-2

-1

0

1

2

3

yhat y in-sample r^2 = 0.0916

-1 -0.5 0 0.5 1 -3 -2 -1 0 1 2 3 4

yhat y independent r^2 = 0.00144