-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 41% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W 110W 0 10N 20N 30N 23% of ssta variance

1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.60273� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw ssta anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected ssta anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected ssta anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 53% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W

-10S 0 10N 20N 30N

14% of ncep variance

1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.68639� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw ncep anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected ncep anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected ncep anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 56% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

60E 80E 100E 120E 140E 160E 180 160W 140W

-10S 0 10N 20N 30N

25% of ccm3 variance

1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.51475� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw ccm3 anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected ccm3 anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected ccm3 anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 57% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W 110W 0 10N 20N 30N 15% of echam3 variance

1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.72512� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw echam3 anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected echam3 anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected echam3 anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 51% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W 110W 0 10N 20N 30N 26% of echam4 variance

1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.6021� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw echam4 anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected echam4 anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected echam4 anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 55% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W 110W 0 10N 20N 30N 8.9% of gsfc variance

1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.66376� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw gsfc anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected gsfc anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected gsfc anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 53% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W 110W 0 10N 20N 30N 21% of cola_T42 variance

1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.65519� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw cola_T42 anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected cola_T42 anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected cola_T42 anomaly correlation--cross-validated

-4 -3 -2 -1 0 1 2 3 4

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N 57% of obs. variance=

-4 -3 -2 -1 0 1 2 3 4

50E 100E 150E 160W 110W 0 10N 20N 30N 14% of cola_T63 variance

1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-0.5

0

0.5 correlation=0.65828� obs model

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Raw cola_T63 anomaly correlation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected cola_T63 anomaly correlation--no cross-validation

0 0.2 0.4 0.6 0.8

66E 68E 70E 72E 74E 76E 19N 20N 21N 22N 23N 24N 25N 26N Corrected cola_T63 anomaly correlation--cross-validated